Get a Sense of Proportion

Imagine building a scale model of the nearby stars, with the nearest star after the Sun, Alpha Centauri, placed 100 yards away. Sirius, the Dog Star, is about 200 yards distant, and the bright stars of the Big Dipper hover a mile above our heads. (In the real world, they’re about 4, 8, and 70 light years from Earth.) How big would the Solar System be?

Here it is, to the same scale! The Sun is 1/10000th inch across, with Earth some 1/80" from it. Even Pluto, the most distant planet, is only half an inch from the Sun.

Pluto

Neptune Uranus Saturn

Jupiter Mars Earth